Pedestals Calib 8596.1

-1

0

1

260 280 300 320 Hut 2.3.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.9

HI gain 0.0 LO gain 0.0

0 25 50

400 450 500 Hut 2.3.10

HI gain 461.6 LO gain 399.3

-1

0

1

260 280 300 320

Hut 2.3.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.12

HI gain 0.0 LO gain 0.0

Pedestals Calib 8596.1

-1

0

1

260 280 300 320

Hut 2.3.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.3.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.4

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.5

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.6

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.8

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.9

HI gain 0.0 LO gain 0.0

0

50

450 500 550 Hut 2.4.10

HI gain 532.9 LO gain 485.8

Pedestals Calib 8596.1

-1

0

1

260 280 300 320

Hut 2.4.11

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.12

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.4.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.4.14

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.3

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.5.4

HI gain 0.0 LO gain 0.0

0

50

100

260 280 300

Hut 2.5.5

HI gain 0.0 LO gain 466.9

0

50

260 280 300

Hut 2.5.6

HI gain 0.0 LO gain 478.2

0

50

100

260 280 300 320 Hut 2.5.7

HI gain 0.0 LO gain 516.0

0

50

100

260 280 300 320 Hut 2.5.8

HI gain 0.0 LO gain 497.6

Pedestals Calib 8596.1

0

20

260 270 280 290 Hut 2.5.9

HI gain 0.0 LO gain 446.6

0

50

400 450 500 Hut 2.5.10

HI gain 482.9 LO gain 448.3

0

50

100

275 300 325 350 Hut 2.6.3

HI gain 0.0 LO gain 566.2

0 50 100

260 280 300 Hut 2.6.4

HI gain 0.0 LO gain 471.8

0

50

100

275 300 325 350 Hut 2.6.5

HI gain 0.0 LO gain 595.0

0

50

100

275 300 325 350 Hut 2.6.6

HI gain 0.0 LO gain 556.5

0

50

100

260 270 280 290 Hut 2.6.7

HI gain 0.0 LO gain 436.0

0

50

100

260 280 300 320 Hut 2.6.8

HI gain 0.0 LO gain 508.4

0 50 100

260 280 300

Hut 2.6.9

HI gain 0.0 LO gain 481.4

0

50

100

400 450 500 Hut 2.6.10

HI gain 458.9 LO gain 447.7

Pedestals Calib 8596.1

-1

0

1

260 280 300 320

Hut 2.6.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.6.14

HI gain 0.0 LO gain 0.0

0

50

100

260 270 280 290 Hut 2.7.3

HI gain 0.0 LO gain 447.5

0

50

100

260 280 300 320 Hut 2.7.4

HI gain 0.0 LO gain 494.3

0

50

260 280 300 320 Hut 2.7.5

HI gain 0.0 LO gain 498.8

0

50

260 280 300 320 Hut 2.7.6

HI gain 0.0 LO gain 506.0

0 25 50

260 270 280 290 Hut 2.7.7

HI gain 0.0 LO gain 437.1

0

50

100

260 280 300 320 340 Hut 2.7.8

HI gain 0.0 LO gain 550.9

0

50

260 280 300

Hut 2.7.9

HI gain 0.0 LO gain 474.4

0

50

100

450 500 550 Hut 2.7.10

HI gain 468.2 LO gain 525.4

Pedestals Calib 8596.1

-1

0

1

260 280 300 320

Hut 2.7.13

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320 Hut 2.7.14

HI gain 0.0 LO gain 0.0

0

50

260 280 300

Hut 2.8.3

HI gain 0.0 LO gain 467.0

0

50

260 280 300

Hut 2.8.4

HI gain 0.0 LO gain 485.7

0 25 50

275 300 325 350 Hut 2.8.5

HI gain 0.0 LO gain 574.0

0

50

260 280 300 320 Hut 2.8.6

HI gain 0.0 LO gain 523.5

0

50

260 280 300 320 340 Hut 2.8.7

HI gain 0.0 LO gain 545.5

0 25 50

260 280 300 320 Hut 2.8.8

HI gain 0.0 LO gain 499.8

0

50

300 350 Hut 2.8.9

HI gain 0.0 LO gain 623.8

0

50

100

500 550 600 Hut 2.8.10

HI gain 545.8 LO gain 580.5

Pedestals Calib 8596.1

0 25 50

260 280 300 320 Hut 2.9.3

HI gain 0.0 LO gain 513.6

0

50

275 300 325 350 Hut 2.9.4

HI gain 0.0 LO gain 564.2

0

50

260 270 280 290 Hut 2.9.5

HI gain 0.0 LO gain 439.9

0 25 50

275 300 325 350 Hut 2.9.6

HI gain 0.0 LO gain 553.2

0 25 50

260 280 300

Hut 2.9.7

HI gain 0.0 LO gain 461.2

0

50

260 280 300 320 Hut 2.9.8

HI gain 0.0 LO gain 491.4

0 25 50

400 450 500 Hut 2.9.9

HI gain 482.8 LO gain 416.2

0

50

400 450 500 Hut 2.10.4

HI gain 433.3 LO gain 505.3

0 25 50

500 550 600

Hut 2.10.5

HI gain 517.9 LO gain 593.8

0

50

450 500 550 Hut 2.10.6

HI gain 503.9 LO gain 514.3

Pedestals Calib 8596.1

0 50 100

450 500 550 Hut 2.10.7

HI gain 499.9 LO gain 485.9

0

50

400 450 500 Hut 2.10.8

HI gain 498.7 LO gain 447.8

0

50

500 550 600 Hut 2.10.9

HI gain 544.3 LO gain 535.6

0 20 40

400 450 500 Hut 2.11.3

HI gain 415.5 LO gain 456.8

0 25 50

450 500 550 600 Hut 2.11.4

HI gain 499.1 LO gain 551.0

0 25 50

350 400 450 Hut 2.11.5

HI gain 493.1 LO gain 310.2

0 25 50

450 500 550 Hut 2.11.6

HI gain 531.7 LO gain 484.5

-1

0

1

260 280 300 320 Hut 2.11.7

HI gain 0.0 LO gain 0.0

-1

0

1

260 280 300 320

Hut 2.11.8

HI gain 0.0 LO gain 0.0

0 25 50

400 450 500 Hut 2.12.3

HI gain 462.9 LO gain 419.3

Pedestals Calib 8596.1

0 25 50

500 550 600 Hut 2.12.4

HI gain 549.8 LO gain 584.1

0 20 40

450 500 550 Hut 2.12.5

HI gain 466.3 LO gain 527.7

0 25 50

400 450 500 Hut 2.12.6

HI gain 475.7 LO gain 467.5

0

50

260 280 300 Hut 2.12.7

HI gain 0.0 LO gain 487.8

-1

0

1

260 280 300 320

Hut 2.12.8

HI gain 0.0 LO gain 0.0

0 25 50

500 550 600 Hut 2.13.3

HI gain 455.6 LO gain 610.7

0

50

500 550 600 Hut 2.13.4

HI gain 520.0 LO gain 614.4

0

50

500 550 600 Hut 2.13.5

HI gain 486.2 LO gain 605.3

0

50

100

450 500 550 Hut 2.13.6

HI gain 417.8 LO gain 576.9

0

50

100

300 350 400 Hut 2.13.7

HI gain 389.6 LO gain 333.8

Pedestals Calib 8596.1

0

50

100

350 400 450 Hut 2.13.8

HI gain 410.3 LO gain 426.2

0

50

400 450 500 Hut 2.14.3

HI gain 429.2 LO gain 493.0

0 25 50

500 550 600 Hut 2.14.4

HI gain 555.2 LO gain 535.7

0 25 50

350 400 450 Hut 2.14.5

HI gain 342.0 LO gain 469.1

0 20 40

500 550 600 Hut 2.14.6

HI gain 569.1 LO gain 498.9

0 25 50

300 350 400 Hut 2.14.7

HI gain 322.7 LO gain 387.0

0

50

300 350 400 Hut 2.14.8

HI gain 360.8 LO gain 386.0

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1069. 8.836

Hut 2.3.3 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1069. 8.836

Hut 2.3.3

Hut 2.3.3 TDC counts

Events

HImean = 3447.5 LOmean = 3490.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1330. 98.11

Hut 2.3.4 TDC counts

Events

0

100

200

1300 1350 1400

Entries Mean RMS 800 1330. 98.11

Hut 2.3.4

Hut 2.3.4 TDC counts

Events

HImean = 3582.6 LOmean = 3596.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1066. 2.093

Hut 2.3.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1066. 2.093

Hut 2.3.5

Hut 2.3.5 TDC counts

Events

HImean = 3670.8 LOmean = 3470.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1052. 1.888

Hut 2.3.6 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1052. 1.888

Hut 2.3.6

Hut 2.3.6 TDC counts

Events

HImean = 3539.8 LOmean = 3010.0

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1015. 109.0

Hut 2.3.7 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1015. 109.0

Hut 2.3.7

Hut 2.3.7 TDC counts

Events

HImean = 3404.9 LOmean = 3086.2

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1142. 15.97

Hut 2.3.8 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1142. 15.97

Hut 2.3.8

Hut 2.3.8 TDC counts

Events

HImean = 3649.3 LOmean = 3260.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1551. 36.60

Hut 2.3.9 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1551. 36.60

Hut 2.3.9

Hut 2.3.9 TDC counts

Events

HImean = 3354.8 LOmean = 3269.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2214. 25.56

Hut 2.3.10 TDC counts

Events

0

100

2200 2250 2300

Entries Mean RMS 800 2214. 25.56

Hut 2.3.10

Hut 2.3.10 TDC counts

Events

HImean = 1319.2 LOmean = 1170.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 584.2 5.004

Hut 2.3.11 TDC counts

Events

0

100

550 600 650

Entries Mean RMS 800 584.2 5.004

Hut 2.3.11

Hut 2.3.11 TDC counts

Events

HImean = 3475.5 LOmean = 2941.9

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 926.4 21.38

Hut 2.3.12 TDC counts

Events

0 50 100

900 950 1000

Entries Mean RMS 800 926.4 21.38

Hut 2.3.12

Hut 2.3.12 TDC counts

Events

HImean = 4048.9 LOmean = 3055.4

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 703.9 121.9

Hut 2.3.13 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 703.9 121.9

Hut 2.3.13

Hut 2.3.13 TDC counts

Events

HImean = 3101.8 LOmean = 2587.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 805.1 2.204

Hut 2.3.14 TDC counts

Events

0

100

200

800 850 900

Entries Mean RMS 800 805.1 2.204

Hut 2.3.14

Hut 2.3.14 TDC counts

Events

HImean = 3699.1 LOmean = 2738.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1126. 12.40

Hut 2.4.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1126. 12.40

Hut 2.4.3

Hut 2.4.3 TDC counts

Events

HImean = 3262.2 LOmean = 3291.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1447. 136.0

Hut 2.4.4 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1447. 136.0

Hut 2.4.4

Hut 2.4.4 TDC counts

Events

HImean = 3479.7 LOmean = 3474.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1356. 97.73

Hut 2.4.5 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1356. 97.73

Hut 2.4.5

Hut 2.4.5 TDC counts

Events

HImean = 3663.6 LOmean = 3424.4

LP calibrations Calib 8596.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.6

Hut 2.4.6 TDC counts

Events

HImean = 2578.1 LOmean = 2545.4

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.4.7

Hut 2.4.7 TDC counts

Events

HImean = 2488.7 LOmean = 2548.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1028. 7.440

Hut 2.4.8 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1028. 7.440

Hut 2.4.8

Hut 2.4.8 TDC counts

Events

HImean = 3331.9 LOmean = 3484.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1053. 1.950

Hut 2.4.9 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1053. 1.950

Hut 2.4.9

Hut 2.4.9 TDC counts

Events

HImean = 4000.3 LOmean = 3577.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 696.4 12.75

Hut 2.4.10 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 696.4 12.75

Hut 2.4.10

Hut 2.4.10 TDC counts

Events

HImean = 1177.5 LOmean = 1436.2

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 648.9 173.3

Hut 2.4.11 TDC counts

Events

0

100

600 650 700

Entries Mean RMS 800 648.9 173.3

Hut 2.4.11

Hut 2.4.11 TDC counts

Events

HImean = 2819.1 LOmean = 2603.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 858.6 3.999

Hut 2.4.12 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 858.6 3.999

Hut 2.4.12

Hut 2.4.12 TDC counts

Events

HImean = 3658.8 LOmean = 2892.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 782.7 14.10

Hut 2.4.13 TDC counts

Events

0

100

200

750 800 850

Entries Mean RMS 800 782.7 14.10

Hut 2.4.13

Hut 2.4.13 TDC counts

Events

HImean = 3867.9 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1049. 107.8

Hut 2.4.14 TDC counts

Events

0

100

1000 1050 1100

Entries Mean RMS 800 1049. 107.8

Hut 2.4.14

Hut 2.4.14 TDC counts

Events

HImean = 3719.9 LOmean = 3470.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1223. 42.09

Hut 2.5.3 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1223. 42.09

Hut 2.5.3

Hut 2.5.3 TDC counts

Events

HImean = 3509.3 LOmean = 3315.8

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1309. 1.864

Hut 2.5.4 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1309. 1.864

Hut 2.5.4

Hut 2.5.4 TDC counts

Events

HImean = 3438.6 LOmean = 3367.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1119. 105.3

Hut 2.5.5 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1119. 105.3

Hut 2.5.5

Hut 2.5.5 TDC counts

Events

HImean = 3303.1 LOmean = 1317.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1141. 2.513

Hut 2.5.6 TDC counts

Events

0

100

200

1100 1150 1200

Entries Mean RMS 800 1141. 2.513

Hut 2.5.6

Hut 2.5.6 TDC counts

Events

HImean = 3634.4 LOmean = 1265.6

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1156. 104.0

Hut 2.5.7 TDC counts

Events

0

100

200

1150 1200 1250

Entries Mean RMS 800 1156. 104.0

Hut 2.5.7

Hut 2.5.7 TDC counts

Events

HImean = 3207.8 LOmean = 702.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1066. 107.3

Hut 2.5.8 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1066. 107.3

Hut 2.5.8

Hut 2.5.8 TDC counts

Events

HImean = 3298.7 LOmean = 1245.6

LP calibrations Calib 8596.1

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2176. 1195.

Hut 2.5.9 TDC counts

Events

-1

0

1

2050 2100 2150

Entries Mean RMS 800 2176. 1195.

Hut 2.5.9

Hut 2.5.9 TDC counts

Events

HImean = 3290.5 LOmean = 4095.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 717.6 1.765

Hut 2.5.10 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 717.6 1.765

Hut 2.5.10

Hut 2.5.10 TDC counts

Events

HImean = 1013.4 LOmean = 1260.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1356. 3.242

Hut 2.6.3 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1356. 3.242

Hut 2.6.3

Hut 2.6.3 TDC counts

Events

HImean = 3370.5 LOmean = 1265.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 844.5 25.92

Hut 2.6.4 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 844.5 25.92

Hut 2.6.4

Hut 2.6.4 TDC counts

Events

HImean = 3330.1 LOmean = 1358.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1059. 2.177

Hut 2.6.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1059. 2.177

Hut 2.6.5

Hut 2.6.5 TDC counts

Events

HImean = 3282.5 LOmean = 1086.7

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1009. 2.013

Hut 2.6.6 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1009. 2.013

Hut 2.6.6

Hut 2.6.6 TDC counts

Events

HImean = 3196.6 LOmean = 1140.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1164. 103.7

Hut 2.6.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1164. 103.7

Hut 2.6.7

Hut 2.6.7 TDC counts

Events

HImean = 3450.8 LOmean = 1139.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1228. 1.933

Hut 2.6.8 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1228. 1.933

Hut 2.6.8

Hut 2.6.8 TDC counts

Events

HImean = 3496.3 LOmean = 1178.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1101. 17.36

Hut 2.6.9 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1101. 17.36

Hut 2.6.9

Hut 2.6.9 TDC counts

Events

HImean = 3186.6 LOmean = 1230.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1629. 87.29

Hut 2.6.10 TDC counts

Events

0

100

1600 1650 1700

Entries Mean RMS 800 1629. 87.29

Hut 2.6.10

Hut 2.6.10 TDC counts

Events

HImean = 1258.1 LOmean = 1397.5

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1085. 262.6

Hut 2.6.13 TDC counts

Events

0

100

200

1050 1100 1150

Entries Mean RMS 800 1085. 262.6

Hut 2.6.13

Hut 2.6.13 TDC counts

Events

HImean = 3684.0 LOmean = 2934.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 831.9 2.056

Hut 2.6.14 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 831.9 2.056

Hut 2.6.14

Hut 2.6.14 TDC counts

Events

HImean = 3751.5 LOmean = 4095.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1430. 94.34

Hut 2.7.3 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1430. 94.34

Hut 2.7.3

Hut 2.7.3 TDC counts

Events

HImean = 3521.7 LOmean = 1186.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1555. 4.339

Hut 2.7.4 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1555. 4.339

Hut 2.7.4

Hut 2.7.4 TDC counts

Events

HImean = 3526.2 LOmean = 1228.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1063. 6.758

Hut 2.7.5 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1063. 6.758

Hut 2.7.5

Hut 2.7.5 TDC counts

Events

HImean = 3351.8 LOmean = 1153.3

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1416. 1.858

Hut 2.7.6 TDC counts

Events

0

100

200

1400 1450 1500

Entries Mean RMS 800 1416. 1.858

Hut 2.7.6

Hut 2.7.6 TDC counts

Events

HImean = 3167.6 LOmean = 1227.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1182. 103.1

Hut 2.7.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1182. 103.1

Hut 2.7.7

Hut 2.7.7 TDC counts

Events

HImean = 3381.4 LOmean = 1231.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1575. 22.32

Hut 2.7.8 TDC counts

Events

0

100

1550 1600 1650

Entries Mean RMS 800 1575. 22.32

Hut 2.7.8

Hut 2.7.8 TDC counts

Events

HImean = 3525.8 LOmean = 4095.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1277. 2.148

Hut 2.7.9 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1277. 2.148

Hut 2.7.9

Hut 2.7.9 TDC counts

Events

HImean = 3425.4 LOmean = 1485.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1464. 103.7

Hut 2.7.10 TDC counts

Events

0

100

1450 1500 1550

Entries Mean RMS 800 1464. 103.7

Hut 2.7.10

Hut 2.7.10 TDC counts

Events

HImean = 1184.9 LOmean = 1164.6

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 793.5 118.4

Hut 2.7.13 TDC counts

Events

0

100

200

750 800 850

Entries Mean RMS 800 793.5 118.4

Hut 2.7.13

Hut 2.7.13 TDC counts

Events

HImean = 4013.6 LOmean = 2745.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 886.1 28.29

Hut 2.7.14 TDC counts

Events

0

100

200

850 900 950

Entries Mean RMS 800 886.1 28.29

Hut 2.7.14

Hut 2.7.14 TDC counts

Events

HImean = 3621.5 LOmean = 3009.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1104. 2.090

Hut 2.8.3 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1104. 2.090

Hut 2.8.3

Hut 2.8.3 TDC counts

Events

HImean = 3399.0 LOmean = 1177.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1098. 2.105

Hut 2.8.4 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1098. 2.105

Hut 2.8.4

Hut 2.8.4 TDC counts

Events

HImean = 3360.6 LOmean = 924.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1321. 2.021

Hut 2.8.5 TDC counts

Events

0

100

1300 1350 1400

Entries Mean RMS 800 1321. 2.021

Hut 2.8.5

Hut 2.8.5 TDC counts

Events

HImean = 3822.4 LOmean = 972.8

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1214. 2.000

Hut 2.8.6 TDC counts

Events

0

100

1200 1250 1300

Entries Mean RMS 800 1214. 2.000

Hut 2.8.6

Hut 2.8.6 TDC counts

Events

HImean = 3448.8 LOmean = 3980.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 901.3 118.6

Hut 2.8.7 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 901.3 118.6

Hut 2.8.7

Hut 2.8.7 TDC counts

Events

HImean = 3482.2 LOmean = 1280.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1185. 145.7

Hut 2.8.8 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1185. 145.7

Hut 2.8.8

Hut 2.8.8 TDC counts

Events

HImean = 3329.9 LOmean = 1148.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1094. 184.2

Hut 2.8.9 TDC counts

Events

0

100

1050 1100 1150

Entries Mean RMS 800 1094. 184.2

Hut 2.8.9

Hut 2.8.9 TDC counts

Events

HImean = 3550.0 LOmean = 1399.9

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2188. 18.30

Hut 2.8.10 TDC counts

Events

0 50 100

2150 2200 2250

Entries Mean RMS 800 2188. 18.30

Hut 2.8.10

Hut 2.8.10 TDC counts

Events

HImean = 540.7 LOmean = 697.4

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1032. 2.105

Hut 2.9.3 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1032. 2.105

Hut 2.9.3

Hut 2.9.3 TDC counts

Events

HImean = 3368.8 LOmean = 1224.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1281. 2.023

Hut 2.9.4 TDC counts

Events

0

100

1250 1300 1350

Entries Mean RMS 800 1281. 2.023

Hut 2.9.4

Hut 2.9.4 TDC counts

Events

HImean = 3318.6 LOmean = 1136.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1105. 2.006

Hut 2.9.5 TDC counts

Events

0

100

1100 1150 1200

Entries Mean RMS 800 1105. 2.006

Hut 2.9.5

Hut 2.9.5 TDC counts

Events

HImean = 3356.1 LOmean = 2418.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1356. 1.806

Hut 2.9.6 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1356. 1.806

Hut 2.9.6

Hut 2.9.6 TDC counts

Events

HImean = 3582.0 LOmean = 2795.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1174. 3.944

Hut 2.9.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1174. 3.944

Hut 2.9.7

Hut 2.9.7 TDC counts

Events

HImean = 3466.4 LOmean = 948.4

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 963.7 6.696

Hut 2.9.8 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 963.7 6.696

Hut 2.9.8

Hut 2.9.8 TDC counts

Events

HImean = 3578.4 LOmean = 1599.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1411. 16.65

Hut 2.9.9 TDC counts

Events

0

100

1400 1450 1500

Entries Mean RMS 800 1411. 16.65

Hut 2.9.9

Hut 2.9.9 TDC counts

Events

HImean = 1463.3 LOmean = 1200.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1144. 183.2

Hut 2.10.4 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1144. 183.2

Hut 2.10.4

Hut 2.10.4 TDC counts

Events

HImean = 1356.0 LOmean = 1286.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1000.0 109.6

Hut 2.10.5 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 1000.0 109.6

Hut 2.10.5

Hut 2.10.5 TDC counts

Events

HImean = 1307.4 LOmean = 1287.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 889.4 113.5

Hut 2.10.6 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 889.4 113.5

Hut 2.10.6

Hut 2.10.6 TDC counts

Events

HImean = 1422.4 LOmean = 1273.8

LP calibrations Calib 8596.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.7 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.10.7

Hut 2.10.7 TDC counts

Events

HImean = 514.8 LOmean = 499.6

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4081. 154.0

Hut 2.10.8 TDC counts

Events

0

500

4020 4040 4060 4080 4100

Entries Mean RMS 800 4081. 154.0

Hut 2.10.8

Hut 2.10.8 TDC counts

Events

HImean = 504.2 LOmean = 467.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2074. 42.57

Hut 2.10.9 TDC counts

Events

0

100

2050 2100 2150

Entries Mean RMS 800 2074. 42.57

Hut 2.10.9

Hut 2.10.9 TDC counts

Events

HImean = 1368.6 LOmean = 1757.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1402. 95.32

Hut 2.11.3 TDC counts

Events

0

100

1350 1400 1450

Entries Mean RMS 800 1402. 95.32

Hut 2.11.3

Hut 2.11.3 TDC counts

Events

HImean = 1371.0 LOmean = 1012.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1179. 146.6

Hut 2.11.4 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1179. 146.6

Hut 2.11.4

Hut 2.11.4 TDC counts

Events

HImean = 1405.7 LOmean = 1329.2

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 954.6 112.1

Hut 2.11.5 TDC counts

Events

0

100

950 1000 1050

Entries Mean RMS 800 954.6 112.1

Hut 2.11.5

Hut 2.11.5 TDC counts

Events

HImean = 1048.7 LOmean = 1007.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 753.2 237.3

Hut 2.11.6 TDC counts

Events

0

100

200

700 750 800

Entries Mean RMS 800 753.2 237.3

Hut 2.11.6

Hut 2.11.6 TDC counts

Events

HImean = 1405.0 LOmean = 1085.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 702.8 169.9

Hut 2.11.7 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 702.8 169.9

Hut 2.11.7

Hut 2.11.7 TDC counts

Events

HImean = 3113.4 LOmean = 2665.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 840.9 2.292

Hut 2.11.8 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 840.9 2.292

Hut 2.11.8

Hut 2.11.8 TDC counts

Events

HImean = 3559.9 LOmean = 2825.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 918.5 226.4

Hut 2.12.3 TDC counts

Events

0

100

900 950 1000

Entries Mean RMS 800 918.5 226.4

Hut 2.12.3

Hut 2.12.3 TDC counts

Events

HImean = 1394.7 LOmean = 1165.0

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 831.5 259.5

Hut 2.12.4 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 831.5 259.5

Hut 2.12.4

Hut 2.12.4 TDC counts

Events

HImean = 1396.9 LOmean = 1316.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 780.3 167.0

Hut 2.12.5 TDC counts

Events

0

100

750 800 850

Entries Mean RMS 800 780.3 167.0

Hut 2.12.5

Hut 2.12.5 TDC counts

Events

HImean = 1412.7 LOmean = 1231.7

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.12.6 TDC counts

Events

0

500

4060 4080 4100

Entries Mean RMS 800 4096.

0.0000E+00

Hut 2.12.6

Hut 2.12.6 TDC counts

Events

HImean = 481.0 LOmean = 489.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 662.2 123.6

Hut 2.12.7 TDC counts

Events

0

100

650 700 750

Entries Mean RMS 800 662.2 123.6

Hut 2.12.7

Hut 2.12.7 TDC counts

Events

HImean = 3777.6 LOmean = 649.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 869.3 2.589

Hut 2.12.8 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 869.3 2.589

Hut 2.12.8

Hut 2.12.8 TDC counts

Events

HImean = 3590.3 LOmean = 2653.6

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 803.2 116.5

Hut 2.13.3 TDC counts

Events

0

100

200

750 800 850 900

Entries Mean RMS 800 803.2 116.5

Hut 2.13.3

Hut 2.13.3 TDC counts

Events

HImean = 1360.8 LOmean = 1374.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1518. 91.38

Hut 2.13.4 TDC counts

Events

0

100

200

1500 1550 1600

Entries Mean RMS 800 1518. 91.38

Hut 2.13.4

Hut 2.13.4 TDC counts

Events

HImean = 1415.1 LOmean = 1373.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 626.6 8.807

Hut 2.13.5 TDC counts

Events

0

100

600 650 700

Entries Mean RMS 800 626.6 8.807

Hut 2.13.5

Hut 2.13.5 TDC counts

Events

HImean = 1427.0 LOmean = 1304.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 809.3 1.799

Hut 2.13.6 TDC counts

Events

0

100

800 850 900

Entries Mean RMS 800 809.3 1.799

Hut 2.13.6

Hut 2.13.6 TDC counts

Events

HImean = 1364.1 LOmean = 1252.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1194. 9.630

Hut 2.13.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1194. 9.630

Hut 2.13.7

Hut 2.13.7 TDC counts

Events

HImean = 584.1 LOmean = 346.8

LP calibrations Calib 8596.1

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 972.3 69.20

Hut 2.13.8 TDC counts

Events

0

50

100

950 1000 1050

Entries Mean RMS 800 972.3 69.20

Hut 2.13.8

Hut 2.13.8 TDC counts

Events

HImean = 1016.2 LOmean = 512.9

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 932.5 1.842

Hut 2.14.3 TDC counts

Events

0

100

200

900 950 1000

Entries Mean RMS 800 932.5 1.842

Hut 2.14.3

Hut 2.14.3 TDC counts

Events

HImean = 1280.4 LOmean = 1207.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 1022. 154.3

Hut 2.14.4 TDC counts

Events

0

100

200

1000 1050 1100

Entries Mean RMS 800 1022. 154.3

Hut 2.14.4

Hut 2.14.4 TDC counts

Events

HImean = 1667.4 LOmean = 1776.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 881.3 161.8

Hut 2.14.5 TDC counts

Events

0

100

850 900 950

Entries Mean RMS 800 881.3 161.8

Hut 2.14.5

Hut 2.14.5 TDC counts

Events

HImean = 1202.5 LOmean = 4072.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 951.5 250.6

Hut 2.14.6 TDC counts

Events

0

100

200

950 1000 1050

Entries Mean RMS 800 951.5 250.6

Hut 2.14.6

Hut 2.14.6 TDC counts

Events

HImean = 1435.0 LOmean = 2382.3

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1184. 11.21

Hut 2.14.7 TDC counts

Events

0

100

1150 1200 1250

Entries Mean RMS 800 1184. 11.21

Hut 2.14.7

Hut 2.14.7 TDC counts

Events

HImean = 1484.7 LOmean = 2816.4

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 1154. 3.191

Hut 2.14.8 TDC counts

Events

0

50

100

1150 1200 1250

Entries Mean RMS 800 1154. 3.191

Hut 2.14.8

Hut 2.14.8 TDC counts

Events

HImean = 1013.1 LOmean = 473.0

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

0.4548E+07/ 16 P1 1140. P2 78.62

icalid

(TDC counts)

Hut 2.3.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.3

Hut 2.3.3 icalid

Δfit (TDC counts)

0.317978 ns/TDCcount

0 2500

5000

10 20 30

12.12 / 14 P1 473.4 P2 156.0

icalid

(TDC counts)

Hut 2.3.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.4

Hut 2.3.4 icalid

Δfit (TDC counts)

0.160266 ns/TDCcount

0 2500

5000

10 20 30

11.64 / 15 P1 229.6 P2 155.7

icalid

(TDC counts)

Hut 2.3.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.5

Hut 2.3.5 icalid

Δfit (TDC counts)

0.160535 ns/TDCcount

0 2500

5000

10 20 30

12.87 / 14 P1 209.5 P2 152.0

icalid

(TDC counts)

Hut 2.3.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.6

Hut 2.3.6 icalid

Δfit (TDC counts)

0.164491 ns/TDCcount

0 2500

5000

10 20 30

548.4 / 14 P1 188.4 P2 156.9

icalid

(TDC counts)

Hut 2.3.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.7

Hut 2.3.7 icalid

Δfit (TDC counts)

0.159307 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

30.52 / 14 P1 296.7 P2 157.3

icalid

(TDC counts)

Hut 2.3.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.8

Hut 2.3.8 icalid

Δfit (TDC counts)

0.158953 ns/TDCcount

0 2000

4000

10 20 30

25.34 / 15 P1 33.02 P2 150.7

icalid

(TDC counts)

Hut 2.3.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.9

Hut 2.3.9 icalid

Δfit (TDC counts)

0.165884 ns/TDCcount

0 2500

5000

10 20 30

0.3108E+05/ 15 P1 401.1 P2 151.3

icalid

(TDC counts)

Hut 2.3.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.10

Hut 2.3.10 icalid

Δfit (TDC counts)

0.16521 ns/TDCcount

0 2000

4000

10 20 30

25.07 / 15 P1 -139.5 P2 149.9

icalid

(TDC counts)

Hut 2.3.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.11

Hut 2.3.11 icalid

Δfit (TDC counts)

0.166772 ns/TDCcount

0

2500

5000

10 20 30

18.46 / 15 P1 151.7 P2 150.9

icalid

(TDC counts)

Hut 2.3.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.12

Hut 2.3.12 icalid

Δfit (TDC counts)

0.165691 ns/TDCcount

TDC calibrations Calib 8596.1

0 2000

4000

10 20 30

21.01 / 14 P1 -115.0 P2 150.7

icalid

(TDC counts)

Hut 2.3.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.13

Hut 2.3.13 icalid

Δfit (TDC counts)

0.165864 ns/TDCcount

0 2000

4000

10 20 30

15.57 / 15 P1 35.58 P2 149.3

icalid

(TDC counts)

Hut 2.3.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.3.14

Hut 2.3.14 icalid

Δfit (TDC counts)

0.167475 ns/TDCcount

0 2500

5000

10 20 30

16.51 / 14 P1 297.8 P2 153.9

icalid

(TDC counts)

Hut 2.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.3

Hut 2.4.3 icalid

Δfit (TDC counts)

0.162455 ns/TDCcount

0 2500

5000

10 20 30

8.277 / 13 P1 491.9 P2 158.3

icalid

(TDC counts)

Hut 2.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.4

Hut 2.4.4 icalid

Δfit (TDC counts)

0.157928 ns/TDCcount

0 2500

5000

10 20 30

12.81 / 14 P1 485.5 P2 157.8

icalid

(TDC counts)

Hut 2.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.5

Hut 2.4.5 icalid

Δfit (TDC counts)

0.15842 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

8.291 / 13 P1 504.6 P2 157.9

icalid

(TDC counts)

Hut 2.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.6

Hut 2.4.6 icalid

Δfit (TDC counts)

0.158365 ns/TDCcount

0 2500

5000

10 20 30

13.18 / 13 P1 361.1 P2 158.2

icalid

(TDC counts)

Hut 2.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.7

Hut 2.4.7 icalid

Δfit (TDC counts)

0.158019 ns/TDCcount

0 2500

5000

10 20 30

15.53 / 14 P1 283.7 P2 157.4

icalid

(TDC counts)

Hut 2.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.8

Hut 2.4.8 icalid

Δfit (TDC counts)

0.158826 ns/TDCcount

0 2500

5000

10 20 30

16.63 / 14 P1 339.2 P2 157.1

icalid

(TDC counts)

Hut 2.4.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.9

Hut 2.4.9 icalid

Δfit (TDC counts)

0.159163 ns/TDCcount

0 2000

4000

10 20 30

0.1436E+06/ 15 P1 104.8 P2 143.3

icalid

(TDC counts)

Hut 2.4.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.10

Hut 2.4.10 icalid

Δfit (TDC counts)

0.174482 ns/TDCcount

TDC calibrations Calib 8596.1

0 2000

4000

10 20 30

13.83 / 14 P1 -135.6 P2 152.7

icalid

(TDC counts)

Hut 2.4.11

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.11

Hut 2.4.11 icalid

Δfit (TDC counts)

0.16376 ns/TDCcount

0 2000

4000

10 20 30

23.56 / 15 P1 97.85 P2 150.6

icalid

(TDC counts)

Hut 2.4.12

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.12

Hut 2.4.12 icalid

Δfit (TDC counts)

0.166004 ns/TDCcount

0 2000

4000

10 20 30

16.38 / 15 P1 7.115 P2 150.0

icalid

(TDC counts)

Hut 2.4.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.13

Hut 2.4.13 icalid

Δfit (TDC counts)

0.166648 ns/TDCcount

0

2000

4000

10 20 30

0.3033E+07/ 15 P1 804.8 P2 101.3

icalid

(TDC counts)

Hut 2.4.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.4.14

Hut 2.4.14 icalid

Δfit (TDC counts)

0.246877 ns/TDCcount

0 2500

5000

10 20 30

11.25 / 14 P1 264.0 P2 157.2

icalid

(TDC counts)

Hut 2.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.3

Hut 2.5.3 icalid

Δfit (TDC counts)

0.159075 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

16.61 / 14 P1 451.6 P2 157.7

icalid

(TDC counts)

Hut 2.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.4

Hut 2.5.4 icalid

Δfit (TDC counts)

0.158565 ns/TDCcount

0 2500

5000

10 20 30

17.45 / 14 P1 221.5 P2 155.4

icalid

(TDC counts)

Hut 2.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.5

Hut 2.5.5 icalid

Δfit (TDC counts)

0.160859 ns/TDCcount

0 2500

5000

10 20 30

22.40 / 15 P1 247.3 P2 154.6

icalid

(TDC counts)

Hut 2.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.6

Hut 2.5.6 icalid

Δfit (TDC counts)

0.161712 ns/TDCcount

0 2500

5000

10 20 30

15.18 / 14 P1 255.0 P2 154.9

icalid

(TDC counts)

Hut 2.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.7

Hut 2.5.7 icalid

Δfit (TDC counts)

0.161426 ns/TDCcount

0 2500

5000

10 20 30

19.87 / 14 P1 290.9 P2 155.6

icalid

(TDC counts)

Hut 2.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.8

Hut 2.5.8 icalid

Δfit (TDC counts)

0.160654 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

10 20 30

0.2322E+07/ 28 P1 1439. P2 28.82

icalid

(TDC counts)

Hut 2.5.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.9

Hut 2.5.9 icalid

Δfit (TDC counts)

0.867549 ns/TDCcount

0 2000

4000

10 20 30

12.68 / 15 P1 15.76 P2 151.4

icalid

(TDC counts)

Hut 2.5.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.5.10

Hut 2.5.10 icalid

Δfit (TDC counts)

0.165129 ns/TDCcount

0 2500

5000

10 20 30

21.01 / 14 P1 499.1 P2 152.5

icalid

(TDC counts)

Hut 2.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.3

Hut 2.6.3 icalid

Δfit (TDC counts)

0.163924 ns/TDCcount

0

2000

4000

10 20 30

0.3453E+07/ 16 P1 670.3 P2 98.33

icalid

(TDC counts)

Hut 2.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.4

Hut 2.6.4 icalid

Δfit (TDC counts)

0.25424 ns/TDCcount

0 2500

5000

10 20 30

16.66 / 15 P1 246.8 P2 153.8

icalid

(TDC counts)

Hut 2.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.5

Hut 2.6.5 icalid

Δfit (TDC counts)

0.162569 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

21.07 / 14 P1 171.5 P2 154.1

icalid

(TDC counts)

Hut 2.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.6

Hut 2.6.6 icalid

Δfit (TDC counts)

0.162223 ns/TDCcount

0

2000

10 20 30

0.5511E+07/ 15 P1 1327. P2 64.83

icalid

(TDC counts)

Hut 2.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.7

Hut 2.6.7 icalid

Δfit (TDC counts)

0.385641 ns/TDCcount

0 2500

5000

10 20 30

22.59 / 15 P1 416.5 P2 154.0

icalid

(TDC counts)

Hut 2.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.8

Hut 2.6.8 icalid

Δfit (TDC counts)

0.16239 ns/TDCcount

0 2500

5000

10 20 30

21.08 / 14 P1 350.5 P2 154.8

icalid

(TDC counts)

Hut 2.6.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.9

Hut 2.6.9 icalid

Δfit (TDC counts)

0.1615 ns/TDCcount

0 2500

5000

10 20 30

9.780 / 14 P1 786.8 P2 154.1

icalid

(TDC counts)

Hut 2.6.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.10

Hut 2.6.10 icalid

Δfit (TDC counts)

0.162278 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

23.19 / 15 P1 284.8 P2 151.8

icalid

(TDC counts)

Hut 2.6.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.13

Hut 2.6.13 icalid

Δfit (TDC counts)

0.16474 ns/TDCcount

0

2500

5000

10 20 30

23.92 / 15 P1 105.7 P2 151.4

icalid

(TDC counts)

Hut 2.6.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.6.14

Hut 2.6.14 icalid

Δfit (TDC counts)

0.165098 ns/TDCcount

0 2500

5000

10 20 30

12.99 / 14 P1 553.3 P2 155.5

icalid

(TDC counts)

Hut 2.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.3

Hut 2.7.3 icalid

Δfit (TDC counts)

0.160723 ns/TDCcount

0 2500

5000

10 20 30

11.24 / 14 P1 683.1 P2 155.6

icalid

(TDC counts)

Hut 2.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.4

Hut 2.7.4 icalid

Δfit (TDC counts)

0.160633 ns/TDCcount

0 2500

5000

10 20 30

12.85 / 14 P1 320.6 P2 155.9

icalid

(TDC counts)

Hut 2.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.5

Hut 2.7.5 icalid

Δfit (TDC counts)

0.160342 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

17.34 / 15 P1 533.2 P2 155.7

icalid

(TDC counts)

Hut 2.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.6

Hut 2.7.6 icalid

Δfit (TDC counts)

0.160516 ns/TDCcount

0 2500

5000

10 20 30

15.59 / 14 P1 357.5 P2 156.0

icalid

(TDC counts)

Hut 2.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.7

Hut 2.7.7 icalid

Δfit (TDC counts)

0.160219 ns/TDCcount

0 2500

5000

10 20 30

10.05 / 14 P1 551.7 P2 155.1

icalid

(TDC counts)

Hut 2.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.8

Hut 2.7.8 icalid

Δfit (TDC counts)

0.161182 ns/TDCcount

0 2500

5000

10 20 30

19.94 / 14 P1 222.2 P2 154.7

icalid

(TDC counts)

Hut 2.7.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.9

Hut 2.7.9 icalid

Δfit (TDC counts)

0.161603 ns/TDCcount

0 2000

4000

10 20 30

21.98 / 14 P1 87.97 P2 150.7

icalid

(TDC counts)

Hut 2.7.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.10

Hut 2.7.10 icalid

Δfit (TDC counts)

0.165848 ns/TDCcount

TDC calibrations Calib 8596.1

0 2000

4000

10 20 30

18.62 / 14 P1 63.12 P2 150.9

icalid

(TDC counts)

Hut 2.7.13

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.13

Hut 2.7.13 icalid

Δfit (TDC counts)

0.165646 ns/TDCcount

0 2000

4000

10 20 30

27.99 / 15 P1 -9.967 P2 150.3

icalid

(TDC counts)

Hut 2.7.14

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.7.14

Hut 2.7.14 icalid

Δfit (TDC counts)

0.166353 ns/TDCcount

0 2500

5000

10 20 30

14.04 / 14 P1 282.5 P2 156.6

icalid

(TDC counts)

Hut 2.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.3

Hut 2.8.3 icalid

Δfit (TDC counts)

0.159632 ns/TDCcount

0 2500

5000

10 20 30

8.777 / 15 P1 234.3 P2 153.1

icalid

(TDC counts)

Hut 2.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.4

Hut 2.8.4 icalid

Δfit (TDC counts)

0.163297 ns/TDCcount

0 2500

5000

10 20 30

10.19 / 14 P1 456.6 P2 156.9

icalid

(TDC counts)

Hut 2.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.5

Hut 2.8.5 icalid

Δfit (TDC counts)

0.159312 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

17.84 / 14 P1 354.0 P2 156.5

icalid

(TDC counts)

Hut 2.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.6

Hut 2.8.6 icalid

Δfit (TDC counts)

0.159784 ns/TDCcount

0

2500

5000

10 20 30

26.56 / 14 P1 53.48 P2 154.0

icalid

(TDC counts)

Hut 2.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.7

Hut 2.8.7 icalid

Δfit (TDC counts)

0.162287 ns/TDCcount

0 2500

5000

10 20 30

20.22 / 15 P1 484.2 P2 150.7

icalid

(TDC counts)

Hut 2.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.8

Hut 2.8.8 icalid

Δfit (TDC counts)

0.165868 ns/TDCcount

0 2500

5000

10 20 30

21.01 / 14 P1 264.4 P2 155.4

icalid

(TDC counts)

Hut 2.8.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.9

Hut 2.8.9 icalid

Δfit (TDC counts)

0.16087 ns/TDCcount

0

2500

5000

10 20 30

19.86 / 15 P1 144.9 P2 151.9

icalid

(TDC counts)

Hut 2.8.10

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.8.10

Hut 2.8.10 icalid

Δfit (TDC counts)

0.164632 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

15.25 / 14 P1 198.2 P2 155.7

icalid

(TDC counts)

Hut 2.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.3

Hut 2.9.3 icalid

Δfit (TDC counts)

0.160548 ns/TDCcount

0 2500

5000

10 20 30

15.15 / 14 P1 500.5 P2 151.1

icalid

(TDC counts)

Hut 2.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.4

Hut 2.9.4 icalid

Δfit (TDC counts)

0.165506 ns/TDCcount

0 2500

5000

10 20 30

20.86 / 15 P1 274.1 P2 152.6

icalid

(TDC counts)

Hut 2.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.5

Hut 2.9.5 icalid

Δfit (TDC counts)

0.16384 ns/TDCcount

0 2500

5000

10 20 30

31.39 / 15 P1 546.3 P2 147.4

icalid

(TDC counts)

Hut 2.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.6

Hut 2.9.6 icalid

Δfit (TDC counts)

0.169589 ns/TDCcount

0 2500

5000

10 20 30

13.21 / 14 P1 368.3 P2 154.1

icalid

(TDC counts)

Hut 2.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.7

Hut 2.9.7 icalid

Δfit (TDC counts)

0.162223 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

24.34 / 15 P1 274.0 P2 152.3

icalid

(TDC counts)

Hut 2.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.8

Hut 2.9.8 icalid

Δfit (TDC counts)

0.164146 ns/TDCcount

0 2000

4000

10 20 30

0.4845E+06/ 15 P1 129.8 P2 135.4

icalid

(TDC counts)

Hut 2.9.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.9.9

Hut 2.9.9 icalid

Δfit (TDC counts)

0.184581 ns/TDCcount

0 2500

5000

10 20 30

22.43 / 14 P1 299.7 P2 152.7

icalid

(TDC counts)

Hut 2.10.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.4

Hut 2.10.4 icalid

Δfit (TDC counts)

0.163762 ns/TDCcount

0 2500

5000

10 20 30

18.54 / 15 P1 265.4 P2 151.0

icalid

(TDC counts)

Hut 2.10.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.5

Hut 2.10.5 icalid

Δfit (TDC counts)

0.165512 ns/TDCcount

0 2000

4000

10 20 30

0.1452E+07/ 16 P1 446.5 P2 125.2

icalid

(TDC counts)

Hut 2.10.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.6

Hut 2.10.6 icalid

Δfit (TDC counts)

0.199681 ns/TDCcount

TDC calibrations Calib 8596.1

0 2000

4000

10 20 30

23.46 / 14 P1 79.63 P2 150.9

icalid

(TDC counts)

Hut 2.10.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.7

Hut 2.10.7 icalid

Δfit (TDC counts)

0.165643 ns/TDCcount

0 2000

4000

10 20 30

19.75 / 14 P1 42.62 P2 150.8

icalid

(TDC counts)

Hut 2.10.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.8

Hut 2.10.8 icalid

Δfit (TDC counts)

0.165802 ns/TDCcount

0

2500

5000

10 20 30

20.67 / 14 P1 193.8 P2 151.4

icalid

(TDC counts)

Hut 2.10.9

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.10.9

Hut 2.10.9 icalid

Δfit (TDC counts)

0.16511 ns/TDCcount

0 2500

5000

10 20 30

8.154 / 14 P1 636.3 P2 155.3

icalid

(TDC counts)

Hut 2.11.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.3

Hut 2.11.3 icalid

Δfit (TDC counts)

0.160962 ns/TDCcount

0 2500

5000

10 20 30

17.43 / 15 P1 437.2 P2 153.0

icalid

(TDC counts)

Hut 2.11.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.4

Hut 2.11.4 icalid

Δfit (TDC counts)

0.163379 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

14.21 / 15 P1 259.6 P2 153.5

icalid

(TDC counts)

Hut 2.11.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.5

Hut 2.11.5 icalid

Δfit (TDC counts)

0.162821 ns/TDCcount

0 2000

4000

10 20 30

1205. / 17 P1 86.96 P2 134.3

icalid

(TDC counts)

Hut 2.11.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.6

Hut 2.11.6 icalid

Δfit (TDC counts)

0.186178 ns/TDCcount

0 2000

4000

10 20 30

7.054 / 15 P1 -32.31 P2 150.9

icalid

(TDC counts)

Hut 2.11.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.7

Hut 2.11.7 icalid

Δfit (TDC counts)

0.16564 ns/TDCcount

0 2000

4000

10 20 30

14.77 / 14 P1 68.26 P2 150.6

icalid

(TDC counts)

Hut 2.11.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.11.8

Hut 2.11.8 icalid

Δfit (TDC counts)

0.165976 ns/TDCcount

0 2500

5000

10 20 30

27.41 / 14 P1 200.8 P2 152.6

icalid

(TDC counts)

Hut 2.12.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.3

Hut 2.12.3 icalid

Δfit (TDC counts)

0.163808 ns/TDCcount

TDC calibrations Calib 8596.1

0

2500

5000

10 20 30

28.65 / 15 P1 97.35 P2 151.6

icalid

(TDC counts)

Hut 2.12.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.4

Hut 2.12.4 icalid

Δfit (TDC counts)

0.164933 ns/TDCcount

0 2000

4000

10 20 30

27.33 / 14 P1 43.33 P2 151.8

icalid

(TDC counts)

Hut 2.12.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.5

Hut 2.12.5 icalid

Δfit (TDC counts)

0.164696 ns/TDCcount

0 2500

5000

10 20 30

27.24 / 15 P1 383.0 P2 154.0

icalid

(TDC counts)

Hut 2.12.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.6

Hut 2.12.6 icalid

Δfit (TDC counts)

0.162328 ns/TDCcount

0

2000

10 20 30

0.6273E+07/ 15 P1 1218. P2 58.47

icalid

(TDC counts)

Hut 2.12.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.7

Hut 2.12.7 icalid

Δfit (TDC counts)

0.427591 ns/TDCcount

0

2500

5000

10 20 30

21.76 / 15 P1 121.8 P2 151.2

icalid

(TDC counts)

Hut 2.12.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.12.8

Hut 2.12.8 icalid

Δfit (TDC counts)

0.165394 ns/TDCcount

TDC calibrations Calib 8596.1

0

2500

5000

10 20 30

12.84 / 14 P1 68.27 P2 152.6

icalid

(TDC counts)

Hut 2.13.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.3

Hut 2.13.3 icalid

Δfit (TDC counts)

0.163853 ns/TDCcount

0

2500

5000

10 20 30

0.1661E+07/ 15 P1 989.7 P2 126.4

icalid

(TDC counts)

Hut 2.13.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.4

Hut 2.13.4 icalid

Δfit (TDC counts)

0.197829 ns/TDCcount

0 2000

4000

10 20 30

16.81 / 14 P1 -94.03 P2 152.1

icalid

(TDC counts)

Hut 2.13.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.5

Hut 2.13.5 icalid

Δfit (TDC counts)

0.164345 ns/TDCcount

0

2500

5000

10 20 30

10.32 / 14 P1 76.57 P2 152.9

icalid

(TDC counts)

Hut 2.13.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.6

Hut 2.13.6 icalid

Δfit (TDC counts)

0.16354 ns/TDCcount

0

2000

4000

10 20 30

0.8049E+07/ 16 P1 1316. P2 67.75

icalid

(TDC counts)

Hut 2.13.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.7

Hut 2.13.7 icalid

Δfit (TDC counts)

0.36898 ns/TDCcount

TDC calibrations Calib 8596.1

0 2500

5000

10 20 30

5682. / 14 P1 209.3 P2 153.8

icalid

(TDC counts)

Hut 2.13.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.13.8

Hut 2.13.8 icalid

Δfit (TDC counts)

0.162594 ns/TDCcount

0 2500

5000

10 20 30

25.75 / 15 P1 237.1 P2 152.6

icalid

(TDC counts)

Hut 2.14.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.3

Hut 2.14.3 icalid

Δfit (TDC counts)

0.163817 ns/TDCcount

0

2000

4000

10 20 30

0.6492E+07/ 16 P1 972.5 P2 89.00

icalid

(TDC counts)

Hut 2.14.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.4

Hut 2.14.4 icalid

Δfit (TDC counts)

0.280912 ns/TDCcount

0

2000

10 20 30

0.5099E+07/ 15 P1 1256. P2 66.51

icalid

(TDC counts)

Hut 2.14.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.5

Hut 2.14.5 icalid

Δfit (TDC counts)

0.375881 ns/TDCcount

0 2500

5000

10 20 30

21.05 / 15 P1 241.7 P2 152.9

icalid

(TDC counts)

Hut 2.14.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.6

Hut 2.14.6 icalid

Δfit (TDC counts)

0.163513 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

0.4646E+07/ 15 P1 1253. P2 80.47

icalid

(TDC counts)

Hut 2.14.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.7

Hut 2.14.7 icalid

Δfit (TDC counts)

0.310668 ns/TDCcount

0 2500

5000

10 20 30

12.97 / 14 P1 445.0 P2 153.8

icalid

(TDC counts)

Hut 2.14.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 2.14.8

Hut 2.14.8 icalid

Δfit (TDC counts)

0.162498 ns/TDCcount